\setbox1=\vbox{
{\null\hfil
\psfig{figure=NAD6.eps,angle=0,width=0.48\textwidth}\hfil
\psfig{figure=NAD15.eps,angle=0,width=0.48\textwidth}\hfil
} \vspace{2ex}
        }
\noindent \copy1
